
diff -r e5302cb1945c -r b9a8a993f4e7 upgrade.sql
--- a/upgrade.sql	Fri Nov 02 20:37:26 2007 -0400
+++ b/upgrade.sql	Fri Nov 02 20:40:45 2007 -0400
@@ -97,6 +97,7 @@
 ---END 1.0b4---
 ---BEGIN 1.0b3---
 INSERT INTO {{TABLE_PREFIX}}config(config_name, config_value) VALUES( 'allowed_mime_types', 'cbf:len=168;crc=c3dcad3f;data=0[1],1[4],0[3],1[1],0[2],1[1],0[11],1[1],0[7],1[1],0[9],1[1],0[6],1[3],0[10],1[1],0[2],1[2],0[1],1[1],0[1],1[2],0[6],1[3],0[1],1[1],0[2],1[4],0[1],1[2],0[3],1[1],0[4],1[2],0[26],1[5],0[6],1[2],0[2],1[1],0[4],1[1],0[10],1[2],0[1],1[1],0[6]|end' );
+ALTER TABLE {{TABLE_PREFIX}}privmsgs ADD COLUMN message_read tinyint(1) NOT NULL DEFAULT 0;
 ---END 1.0b3---
 ---BEGIN 1.0b2---
 -- 10/1: Removed alterations to users table, moved to upgrade.php, to allow the session manager to work




